78

82

88

89

90

93

94

96

96

96

99

99

99

101

101

104 104

104

104 104

105

105

105

105 106

106

107

107

107

108

108

108

109

109

109 110

110

110

110

110

111 111

112

112

112

112 113

113

113

113

113

113 113

114

115 115

115

116

116

116

116

116

117

118

118

118

118 118

119

119

119

119

119

119 119

119

120

120

120

120

120

121

121

121

122

122

122

122

122

122

123

123

123

123

124 124

124

124 125

125

M67

13 12 11 10 9 8

Z

R N

E

XEphem Alt/Az Sky View Calgary, Alberta Center RA: 8:50:59.6 Declination: 11:48:56 Epoch: 2000.00 Altitude: -13:26:49 Azimuth: 50:56:56 Field Width: 0:41

Julian Date: 2454592.20380 Sidereal Time: 0:13:26 UTC Date: 5/05/2008 UTC Time: 16:53:28

Latitude: 51:03:39 N Longitude: 113:56:22 W

M67 for Telescope Limiting Magnitude

Created by XEphem Version 3.7.2 November 12, 2006 Copyright (c) 1990-2006 by Elwood Charles Downey http://www.xephem.com Generated Mon May 5 17:26:59 2008 UTC